\documentclass{article}
\usepackage{microtype}
\usepackage{venturis2}
\pagestyle{empty}
\linespread{1.2}
\begin{document}
\frenchspacing

\begin{description}
\item{\bf Venturis No2:}
Like the original Venturis typeface, but with an even smaller x-height. To use, place
\textbackslash usepackage\{venturis2\} in the document header.
\end{description}

\end{document}
