\documentclass{article}
\usepackage{microtype}
\usepackage[OT1]{fontenc}
\usepackage{boisik}
\usepackage{mflogo}
\usepackage[utf8]{inputenc}
\pagestyle{empty}
\linespread{1.2}
\begin{document}
\frenchspacing
\noindent
{\LARGE $10$ Boisik}~\\
~\\
Boisik is without a doubt the ugliest font available in any \LaTeX distribution.
One look at this paragraph and you'll agree that the last place in this Top 10 is a well-deserved one.

However, Boisik is very much worth mentioning because it has completely been written in the archaic \MF{} system.
That's right, every parameter of this font is globally adjustable, and every font size has different glyphs.

Boisik is a tribute to the original Computer Modern typeface, and it's ugliness only underwrites the geniousness
of Knuth's creation.


\end{document}
